From 63c9b5d663fb0515b0079d7eaf81e26b99de012a Mon Sep 17 00:00:00 2001
From: David M <davidmj@users.sourceforge.net>
Date: Sat, 29 Apr 2006 16:30:56 +0000
Subject: - CAPTCHA!

Xore and NeoThermic are very cool, you must thank them!


git-svn-id: file:///svn/phpbb/trunk@5862 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/install/schemas/schema_data.sql | 7 +++++++
 1 file changed, 7 insertions(+)

(limited to 'phpBB/install/schemas/schema_data.sql')

diff --git a/phpBB/install/schemas/schema_data.sql b/phpBB/install/schemas/schema_data.sql
index 3e6b6d694e..d9fcb080ab 100644
--- a/phpBB/install/schemas/schema_data.sql
+++ b/phpBB/install/schemas/schema_data.sql
@@ -160,6 +160,13 @@ INSERT INTO phpbb_config (config_name, config_value) VALUES ('pass_complex', '.*
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('pm_edit_time', '0');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('pm_max_boxes', '4');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('pm_max_msgs', '50');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_occlude', '1');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_occlude_noise_pixel', '2');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_occlude_noise_line', '1');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_entropy', '1');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_entropy_noise_pixel', '2');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_entropy_noise_line', '1');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('policy_3dbitmap', '1');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('posts_per_page', '10');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('print_pm', '1');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('queue_interval', '600');
-- 
cgit v1.2.1

