From 3bb93ab2d34251a51b67c722db3b40500749fa17 Mon Sep 17 00:00:00 2001
From: Joas Schilling <nickvergessen@gmx.de>
Date: Tue, 15 Oct 2013 22:46:02 +0200
Subject: [develop] Update version to 3.1.0-a2-dev

---
 phpBB/install/schemas/schema_data.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'phpBB/install/schemas/schema_data.sql')

diff --git a/phpBB/install/schemas/schema_data.sql b/phpBB/install/schemas/schema_data.sql
index 0aa84a7610..794def40dc 100644
--- a/phpBB/install/schemas/schema_data.sql
+++ b/phpBB/install/schemas/schema_data.sql
@@ -270,7 +270,7 @@ INSERT INTO phpbb_config (config_name, config_value) VALUES ('tpl_allow_php', '0
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('upload_icons_path', 'images/upload_icons');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('upload_path', 'files');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('use_system_cron', '0');
-INSERT INTO phpbb_config (config_name, config_value) VALUES ('version', '3.1.0-a1');
+INSERT INTO phpbb_config (config_name, config_value) VALUES ('version', '3.1.0-a2-dev');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('warnings_expire_days', '90');
 INSERT INTO phpbb_config (config_name, config_value) VALUES ('warnings_gc', '14400');
 
-- 
cgit v1.2.1

