From 98964a913cb22761553d04170aa4830e324f7488 Mon Sep 17 00:00:00 2001
From: Oleg Pudeyev <oleg@bsdpower.com>
Date: Wed, 4 Apr 2012 18:28:36 -0400
Subject: [ticket/10650] Revert merge of 'rahulr92/ticket/10650' into develop

The pull request (#654) was merged a little too quickly.

In particular, display_last_subject per-forum option needs consensus.

This reverts commit b1fb34a4d7e446768b9f66ba6dd359173cd2a5fb, reversing
changes made to 7d6b289671c51694f17dd5f9849abf2534b55e59.

PHPBB3-10650
---
 phpBB/install/schemas/postgres_schema.sql | 1 -
 1 file changed, 1 deletion(-)

(limited to 'phpBB/install/schemas/postgres_schema.sql')

diff --git a/phpBB/install/schemas/postgres_schema.sql b/phpBB/install/schemas/postgres_schema.sql
index 91e5629791..c624024362 100644
--- a/phpBB/install/schemas/postgres_schema.sql
+++ b/phpBB/install/schemas/postgres_schema.sql
@@ -398,7 +398,6 @@ CREATE TABLE phpbb_forums (
 	forum_options INT4 DEFAULT '0' NOT NULL CHECK (forum_options >= 0),
 	display_subforum_list INT2 DEFAULT '1' NOT NULL CHECK (display_subforum_list >= 0),
 	display_on_index INT2 DEFAULT '1' NOT NULL CHECK (display_on_index >= 0),
-	display_last_subject INT2 DEFAULT '1' NOT NULL CHECK (display_last_subject >= 0),
 	enable_indexing INT2 DEFAULT '1' NOT NULL CHECK (enable_indexing >= 0),
 	enable_icons INT2 DEFAULT '1' NOT NULL CHECK (enable_icons >= 0),
 	enable_prune INT2 DEFAULT '0' NOT NULL CHECK (enable_prune >= 0),
-- 
cgit v1.2.1

