From 0334d424779dac4f0adf89caa0362a03f93163c3 Mon Sep 17 00:00:00 2001
From: Meik Sievertsen <acydburn@phpbb.com>
Date: Wed, 28 Dec 2005 17:35:20 +0000
Subject: - some changes to browser checking (was the reason for not working
 logins) - partly working style acp - other tiny changes here and there

git-svn-id: file:///svn/phpbb/trunk@5388 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/install/schemas/postgres_schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'phpBB/install/schemas/postgres_schema.sql')

diff --git a/phpBB/install/schemas/postgres_schema.sql b/phpBB/install/schemas/postgres_schema.sql
index 831a5382da..5f99762ed9 100644
--- a/phpBB/install/schemas/postgres_schema.sql
+++ b/phpBB/install/schemas/postgres_schema.sql
@@ -817,7 +817,7 @@ CREATE TABLE phpbb_sessions (
    session_start INT4 DEFAULT '0' NOT NULL,
    session_time INT4 DEFAULT '0' NOT NULL,
    session_ip varchar(40) DEFAULT '0' NOT NULL,
-   session_browser varchar(100) DEFAULT '' NULL,
+   session_browser varchar(150) DEFAULT '' NULL,
    session_page varchar(100) DEFAULT '' NOT NULL,
    session_viewonline INT2 DEFAULT '1' NOT NULL,
    session_admin INT2 DEFAULT '0' NOT NULL,
-- 
cgit v1.2.1

