From 431e494ae43257bea251a59ed6b2a4bb20eb7fd4 Mon Sep 17 00:00:00 2001
From: Meik Sievertsen <acydburn@phpbb.com>
Date: Thu, 6 Apr 2006 17:15:45 +0000
Subject: To all people having their bug status set to fixed: SF pserver CVS
 access is currently down, therefore the snapshots are still out of date.

- fix a bunch of bugs
- <!-- $Id$ --> is no longer allowed in template (.html) files
- changed layout of private message screens (folders are menu items)
- removed unread mode for private messages
- added new feature to template engine - "jump out of loop" or "loop another loop within my loop" :D (will be documented within the coding guidelines)
- added autologin field to sessions
- check session length checks
- added add_log statement to sessions to track session valid to invalid changes if ip/browser change depending on config settings (only debug)
- added multibyte support for various variables (exception at the moment is usernames which needs some discussion)
- hopefully not broke something. :/


git-svn-id: file:///svn/phpbb/trunk@5765 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/install/schemas/mysql_schema.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'phpBB/install/schemas/mysql_schema.sql')

diff --git a/phpBB/install/schemas/mysql_schema.sql b/phpBB/install/schemas/mysql_schema.sql
index 1468e38ebc..cc6ee790ce 100644
--- a/phpBB/install/schemas/mysql_schema.sql
+++ b/phpBB/install/schemas/mysql_schema.sql
@@ -611,6 +611,7 @@ CREATE TABLE phpbb_sessions (
    session_browser varchar(150) DEFAULT '' NOT NULL,
    session_page varchar(200) DEFAULT '' NOT NULL,
    session_viewonline tinyint(1) DEFAULT '1' NOT NULL,
+   session_autologin tinyint(1) DEFAULT '0' NOT NULL,
    session_admin tinyint(1) DEFAULT '0' NOT NULL,
    PRIMARY KEY (session_id),
    KEY session_time (session_time),
-- 
cgit v1.2.1

