From c7a986eccdac183cc81b3da486092f4ab82109ba Mon Sep 17 00:00:00 2001
From: Nils Adermann <naderman@naderman.de>
Date: Mon, 29 Aug 2011 17:17:40 -0400
Subject: [feature/extension-manager] Use an incremental process for enable and
 purge

The enable or purge operation of an extension could take a long time if an
expensive operation needs to be executed on a large set of data. To allow
this to succeed from a web interface with max_execution_time set in the
webserver's php configuration, subsequent requests must continue the
operation started earlier. So individual enable and purge implementations
must be able to spread their work across multiple steps.

PHPBB3-10323
---
 phpBB/install/schemas/mysql_41_schema.sql | 1 +
 1 file changed, 1 insertion(+)

(limited to 'phpBB/install/schemas/mysql_41_schema.sql')

diff --git a/phpBB/install/schemas/mysql_41_schema.sql b/phpBB/install/schemas/mysql_41_schema.sql
index 2f2de17dcb..139833b7b9 100644
--- a/phpBB/install/schemas/mysql_41_schema.sql
+++ b/phpBB/install/schemas/mysql_41_schema.sql
@@ -195,6 +195,7 @@ CREATE TABLE phpbb_drafts (
 CREATE TABLE phpbb_ext (
 	ext_name varchar(255) DEFAULT '' NOT NULL,
 	ext_active tinyint(1) UNSIGNED DEFAULT '0' NOT NULL,
+	ext_state text NOT NULL,
 	UNIQUE ext_name (ext_name)
 ) CHARACTER SET `utf8` COLLATE `utf8_bin`;
 
-- 
cgit v1.2.1

