From 9affd6f7e7b95442f1ef14894858d8213f3fbd2a Mon Sep 17 00:00:00 2001
From: Joas Schilling <nickvergessen@gmx.de>
Date: Fri, 11 Jan 2013 00:41:03 +0100
Subject: [ticket/11201] Remove MSN/WLM fields

WLM will be shutdown in March 2013. Skype is the new replacement. But as Skype
uses a different login ID and service, the values in this field are useless.
So we can safely remove the field and the links/functions we create.

PHPBB3-11201
---
 phpBB/install/schemas/firebird_schema.sql | 1 -
 1 file changed, 1 deletion(-)

(limited to 'phpBB/install/schemas/firebird_schema.sql')

diff --git a/phpBB/install/schemas/firebird_schema.sql b/phpBB/install/schemas/firebird_schema.sql
index ef57df29a0..9016d8b318 100644
--- a/phpBB/install/schemas/firebird_schema.sql
+++ b/phpBB/install/schemas/firebird_schema.sql
@@ -1281,7 +1281,6 @@ CREATE TABLE phpbb_users (
 	user_icq VARCHAR(15) CHARACTER SET NONE DEFAULT '' NOT NULL,
 	user_aim VARCHAR(255) CHARACTER SET UTF8 DEFAULT '' NOT NULL COLLATE UNICODE,
 	user_yim VARCHAR(255) CHARACTER SET UTF8 DEFAULT '' NOT NULL COLLATE UNICODE,
-	user_msnm VARCHAR(255) CHARACTER SET UTF8 DEFAULT '' NOT NULL COLLATE UNICODE,
 	user_jabber VARCHAR(255) CHARACTER SET UTF8 DEFAULT '' NOT NULL COLLATE UNICODE,
 	user_website VARCHAR(200) CHARACTER SET UTF8 DEFAULT '' NOT NULL COLLATE UNICODE,
 	user_occ BLOB SUB_TYPE TEXT CHARACTER SET UTF8 DEFAULT '' NOT NULL,
-- 
cgit v1.2.1

