From b09d366df6e52ff52b718006e07bc82439d375ed Mon Sep 17 00:00:00 2001
From: natec <natec@users.sourceforge.net>
Date: Sat, 9 Jun 2001 20:45:21 +0000
Subject: Bad paul.. no comma.

git-svn-id: file:///svn/phpbb/trunk@444 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/db/mysql_schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'phpBB/db/mysql_schema.sql')

diff --git a/phpBB/db/mysql_schema.sql b/phpBB/db/mysql_schema.sql
index 54645c0dc3..379b905f0c 100644
--- a/phpBB/db/mysql_schema.sql
+++ b/phpBB/db/mysql_schema.sql
@@ -190,7 +190,7 @@ CREATE TABLE phpbb_forums (
    auth_sticky tinyint(4) DEFAULT '0' NOT NULL,
    auth_votecreate tinyint(4) DEFAULT '0' NOT NULL,
    auth_vote tinyint(4) DEFAULT '0' NOT NULL,
-   auth_attachments tinyint(4) DEFAULT '0' NOT NULL
+   auth_attachments tinyint(4) DEFAULT '0' NOT NULL,
    PRIMARY KEY (forum_id),
    KEY forum_id (forum_id),
    KEY forums_order (forum_order),
-- 
cgit v1.2.1

