From 0334d424779dac4f0adf89caa0362a03f93163c3 Mon Sep 17 00:00:00 2001
From: Meik Sievertsen <acydburn@phpbb.com>
Date: Wed, 28 Dec 2005 17:35:20 +0000
Subject: - some changes to browser checking (was the reason for not working
 logins) - partly working style acp - other tiny changes here and there

git-svn-id: file:///svn/phpbb/trunk@5388 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/install/schemas/sqlite_schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'phpBB/install/schemas/sqlite_schema.sql')

diff --git a/phpBB/install/schemas/sqlite_schema.sql b/phpBB/install/schemas/sqlite_schema.sql
index 128605bcc9..a8ecce69eb 100644
--- a/phpBB/install/schemas/sqlite_schema.sql
+++ b/phpBB/install/schemas/sqlite_schema.sql
@@ -599,7 +599,7 @@ CREATE TABLE phpbb_sessions (
   session_start int(11) NOT NULL DEFAULT '0',
   session_time int(11) NOT NULL DEFAULT '0',
   session_ip varchar(40) NOT NULL DEFAULT '0',
-  session_browser varchar(100) NOT NULL DEFAULT '',
+  session_browser varchar(150) NOT NULL DEFAULT '',
   session_page varchar(100) NOT NULL DEFAULT '',
   session_viewonline tinyint(1) NOT NULL DEFAULT '1',
   session_admin tinyint(1) NOT NULL DEFAULT '0',
-- 
cgit v1.2.1

