From 46f33fae4197b1d6d992c8a503077da96b9ae07b Mon Sep 17 00:00:00 2001
From: Meik Sievertsen <acydburn@phpbb.com>
Date: Sun, 13 Apr 2003 11:10:54 +0000
Subject: Installation should work again.

git-svn-id: file:///svn/phpbb/trunk@3823 89ea8834-ac86-4346-8a33-228a782c2dd0
---
 phpBB/install/schemas/mysql_schema.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'phpBB/install/schemas/mysql_schema.sql')

diff --git a/phpBB/install/schemas/mysql_schema.sql b/phpBB/install/schemas/mysql_schema.sql
index ba3331f75a..c81ec512cb 100644
--- a/phpBB/install/schemas/mysql_schema.sql
+++ b/phpBB/install/schemas/mysql_schema.sql
@@ -93,7 +93,7 @@ CREATE TABLE phpbb_auth_options (
 CREATE TABLE phpbb_auth_presets (
   preset_id tinyint(4) NOT NULL auto_increment, 
   preset_name varchar(50) DEFAULT '' NOT NULL, 
-  preset_user_id mediumint(5) DEFAULT 0 UNSIGNED NOT NULL, 
+  preset_user_id mediumint(5) UNSIGNED DEFAULT '0' NOT NULL, 
   preset_type varchar(2) DEFAULT '' NOT NULL, 
   preset_data text DEFAULT '' NOT NULL,
   PRIMARY KEY (preset_id),
-- 
cgit v1.2.1

